en	The username is already in use.
la-la	crwdns5998:0crwdne5998:0

en	The hostname "{0}" was not valid.
la-la	crwdns5999:0{0}crwdne5999:0

en	The given password was empty.
la-la	crwdns6000:0crwdne6000:0

en	The passwords did not match.
la-la	crwdns6001:0crwdne6001:0