en	The username is already in use.
no	Brukernavnet er allerede i bruk.

en	The hostname "{0}" was not valid.
no	Vertsnavnet "{0}" er ikke gyldig.

en	The given password was empty.
no	Det angitte passordet var tomt.

en	The passwords did not match.
no	Passordene er ikke like.